QA track, main task results — Fudan University (Wu)

Run ID FDUQAT15B Average per-series score: 0.185 Factoid accuracy: 0.201 Average F for list questions: 0.145 Average F(β = 3) other score: 0.222 Average F(β = 3) Pyramid other score: 0.212

Factoid Counts # globally correct 81 # locally correct 4 # inexact 16 # unsupported 26 # wrong 276 NIL precision 7 /121 = 0.058 NIL recall 7 / 17 = 0.412