QA track, main task results — Dalhousie University

Run ID Dal06e Average per-series score: 0.046 Factoid accuracy: 0.089 Average F for list questions: 0.021 Average F(β = 3) other score: 0.028 Average F(β = 3) Pyramid other score: 0.032

Factoid Counts # globally correct 36 # locally correct 2 # inexact 5 # unsupported 3 # wrong 357 NIL precision 5 /157 = 0.032 NIL recall 5 / 17 = 0.294