Terabyte Track results, named-page finding task — RMIT University

zetnp Run Type automatic Fields Used title Web features none Number of Topics: 252 % of collection indexed 100% Indexing time 729 min. Avg. time to retrieve top 20 9 sec. Total processing time 2652 sec. Size of on-disk structures 17 GB Number of CPUs 1 System RAM 2 GB Year of system purchase 2004 Approx. system cost $1200 Mean reciprocal rank 0.306 Topics with target at rank 1 57 Topics with target in top 10 118 Topics with no target found 60