Terabyte Track results, adhoc search task — Dublin City University

DCU05ABM25 Run Type automatic Fields Used title Links/Anchor text/Structure used none Number of Topics: 50 Total number of documents over all topics Retrieved: 50000 Relevant: 10407 Rel-ret: 6487 % of collection indexed 100% Number of CPUs 5 Indexing time 4940 min. System RAM 4.5 GB Avg. time to retrieve top 20 2.4 sec. Approx. system cost $13125 Total processing time 120 sec. Year of system purchase 2003 Size of on-disk structures 57.3 GB

Recall Level Averages Recall Precision 0.00 0.8225 0.10 0.5781 0.20 0.4982 0.30 0.4319 0.40 0.3705 0.50 0.2908 0.60 0.2105 0.70 0.1390 0.80 0.0642 0.90 0.0237 1.00 0.0028 Mean average precision non-interpolated 0.2887

Document Level Averages Precision At 5 docs 0.6280 At 10 docs 0.5880 At 15 docs 0.5533 At 20 docs 0.5310 At 30 docs 0.5027 At 100 docs 0.4092 At 200 docs 0.3293 At 500 docs 0.2040 At 1000 docs 0.1297 R-Precision 0.3539 bpref 0.3441