Genomics Track results, adhoc search task — University of Waterloo (Clarke)

Summary Statistics Run ID: uwmtEg05fb Run Type automatic Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 4584 Rel-ret: 3488

Recall Level Averages Recall Precision 0.00 0.6037 0.10 0.4195 0.20 0.3564 0.30 0.2998 0.40 0.2707 0.50 0.2378 0.60 0.1945 0.70 0.1483 0.80 0.1085 0.90 0.0636 1.00 0.0074 Mean average precision non-interpolated 0.2359

Document Level Averages Precision At 5 docs 0.4163 At 10 docs 0.3878 At 15 docs 0.3673 At 20 docs 0.3469 At 30 docs 0.3163 At 100 docs 0.2257 At 200 docs 0.1738 At 500 docs 0.1113 At 1000 docs 0.0712 R-Precision 0.2573 bpref 0.7107