Genomics Track results, categorization task — Queen’s University

allele subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized aQUNB8 281 602 51 0.3182 0.8464 0.4626 17.00 4175 5644 0.7397 aQUT11 257 422 75 0.3785 0.7741 0.5084 17.00 3947 5644 0.6993 aQUT14 288 516 44 0.3582 0.8675 0.5070 17.00 4380 5644 0.7760

expression subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized eQUNB11 67 550 38 0.1086 0.6381 0.1856 64.00 3738 6720 0.5563 eQUNB19 48 376 57 0.1132 0.4571 0.1815 64.00 2696 6720 0.4012 eQUT18 55 514 50 0.0967 0.5238 0.1632 64.00 3006 6720 0.4473

go subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized gQUNB12 342 1791 176 0.1603 0.6602 0.2580 11.00 1971 5698 0.3459 gQUNB15 294 1105 224 0.2102 0.5676 0.3067 11.00 2129 5698 0.3736 gQUT22 319 1442 199 0.1811 0.6158 0.2799 11.00 2067 5698 0.3628

tumor subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized tQUNB3 18 721 2 0.0244 0.9000 0.0474 231.00 3437 4620 0.7439 tQUT10 20 1498 0 0.0132 1.0000 0.0260 231.00 3122 4620 0.6758 tQUT14 13 29 7 0.3095 0.6500 0.4194 231.00 2974 4620 0.6437