Genomics Track results, categorization task — Oregon Health & Science University

allele subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized AOHSUBF 298 693 34 0.3007 0.8976 0.4505 17.00 4373 5644 0.7748 AOHSUSL 291 553 41 0.3448 0.8765 0.4949 17.00 4394 5644 0.7785 AOHSUVP 298 540 34 0.3556 0.8976 0.5094 17.00 4526 5644 0.8019

expression subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized EOHSUBF 101 2393 4 0.0405 0.9619 0.0777 64.00 4071 6720 0.6058 EOHSUSL 104 2742 1 0.0365 0.9905 0.0705 64.00 3914 6720 0.5824 EOHSUVP 78 1048 27 0.0693 0.7429 0.1267 64.00 3944 6720 0.5869

go subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized GOHSUBF 471 2023 47 0.1889 0.9093 0.3127 11.00 3158 5698 0.5542 GOHSUSL 333 980 185 0.2536 0.6429 0.3637 11.00 2683 5698 0.4709 GOHSUVP 405 1350 113 0.2308 0.7819 0.3564 11.00 3105 5698 0.5449

tumor subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized TOHSUBF 19 972 1 0.0192 0.9500 0.0376 231.00 3417 4620 0.7396 TOHSUSL 18 692 2 0.0254 0.9000 0.0493 231.00 3466 4620 0.7502 TOHSUVP 18 742 2 0.0237 0.9000 0.0462 231.00 3416 4620 0.7394