Genomics Track results, categorization task — IBM India Research Laboratory

allele subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized aIBMIRLmet 280 595 52 0.3200 0.8434 0.4640 17.00 4165 5644 0.7380 aIBMIRLrul 294 629 38 0.3185 0.8855 0.4685 17.00 4369 5644 0.7741 aIBMIRLsvm 297 699 35 0.2982 0.8946 0.4473 17.00 4350 5644 0.7707

expression subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized eIBMIRLmet 77 1151 28 0.0627 0.7333 0.1155 64.00 3777 6720 0.5621 eIBMIRLrul 76 1108 29 0.0642 0.7238 0.1179 64.00 3756 6720 0.5589 eIBMIRLsvm 97 1602 8 0.0571 0.9238 0.1075 64.00 4606 6720 0.6854

go subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized gIBMIRLmet 467 1836 51 0.2028 0.9015 0.3311 11.00 3301 5698 0.5793 gIBMIRLrul 481 2073 37 0.1883 0.9286 0.3132 11.00 3218 5698 0.5648 gIBMIRLsvm 449 1721 69 0.2069 0.8668 0.3341 11.00 3218 5698 0.5648

tumor subtask Run TP FP FN Precision Recall F beta Utility Factor Raw Max Normalized tIBMIRLmet 19 182 1 0.0945 0.9500 0.1719 231.00 4207 4620 0.9106 tIBMIRLrul 19 439 1 0.0415 0.9500 0.0795 231.00 3950 4620 0.8550 tIBMIRLsvm 16 504 4 0.0308 0.8000 0.0593 231.00 3192 4620 0.6909