Web Track, mixed-query task results — Virginia Tech

Summary Statistics Run ID: VT2 Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-URLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222649 74198 73945 74506 Relevant: 1763 1600 80 83 Rel-ret: 336 326 8 2 Official task measures All topics TD NP HP Average Precision: 0.0058 0.0064 0.0066 0.0045 Success@1: 0.0044 0.0133 0.0000 0.0000 Success@5: 0.0444 0.1067 0.0133 0.0133 Success@10: 0.0622 0.1467 0.0267 0.0133 Precision @ 10 docs: 0.0187 Precision @ “R” docs: 0.0051 0.0154 0.0000 0.0000 Mean repirocal rank: 0.0261 0.0673 0.0066 0.0045 Topics with no relevant found: 161 21 67 73

Summary Statistics Run ID: VT3 Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-URLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222649 74198 73945 74506 Relevant: 1763 1600 80 83 Rel-ret: 227 223 3 1 Official task measures All topics TD NP HP Average Precision: 0.0007 0.0018 0.0003 0.0000 Success@1: 0.0044 0.0133 0.0000 0.0000 Success@5: 0.0178 0.0533 0.0000 0.0000 Success@10: 0.0222 0.0667 0.0000 0.0000 Precision @ 10 docs: 0.0067 Precision @ “R” docs: 0.0009 0.0028 0.0000 0.0000 Mean repirocal rank: 0.0108 0.0321 0.0003 0.0000 Topics with no relevant found: 177 31 72 74

Web Track, mixed-query task results — Virginia Tech

Summary Statistics Run ID: VTOK5 Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-URLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222649 74198 73945 74506 Relevant: 1763 1600 80 83 Rel-ret: 1133 974 79 80 Official task measures All topics TD NP HP Average Precision: 0.2946 0.1007 0.5107 0.2724 Success@1: 0.2533 0.1867 0.4000 0.1733 Success@5: 0.5022 0.4933 0.6400 0.3733 Success@10: 0.5644 0.5333 0.7333 0.4267 Precision @ 10 docs: 0.1347 Precision @ “R” docs: 0.2294 0.1148 0.4000 0.1733 Mean repirocal rank: 0.3646 0.3124 0.5109 0.2704 Topics with no relevant found: 5 1 1 3

Summary Statistics Run ID: VTTD1 Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-URLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222649 74198 73945 74506 Relevant: 1763 1600 80 83 Rel-ret: 265 259 3 3 Official task measures All topics TD NP HP Average Precision: 0.0029 0.0053 0.0008 0.0027 Success@1: 0.0089 0.0267 0.0000 0.0000 Success@5: 0.0222 0.0533 0.0000 0.0133 Success@10: 0.0444 0.1200 0.0000 0.0133 Precision @ 10 docs: 0.0173 Precision @ “R” docs: 0.0045 0.0135 0.0000 0.0000 Mean repirocal rank: 0.0203 0.0574 0.0008 0.0027 Topics with no relevant found: 171 27 72 72

Web Track, mixed-query task results — Virginia Tech

Summary Statistics Run ID: VT1 Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-URLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222649 74198 73945 74506 Relevant: 1763 1600 80 83 Rel-ret: 228 222 3 3 Official task measures All topics TD NP HP Average Precision: 0.0022 0.0032 0.0008 0.0027 Success@1: 0.0089 0.0267 0.0000 0.0000 Success@5: 0.0222 0.0533 0.0000 0.0133 Success@10: 0.0356 0.0933 0.0000 0.0133 Precision @ 10 docs: 0.0107 Precision @ “R” docs: 0.0020 0.0060 0.0000 0.0000 Mean repirocal rank: 0.0177 0.0497 0.0008 0.0027 Topics with no relevant found: 172 28 72 72