Web Track, mixed-query task results — University of Glasgow

Summary Statistics Run ID: uogWebCA Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222611 74186 73941 74484 Relevant: 1763 1600 80 83 Rel-ret: 1278 1118 78 82 Official task measures All topics TD NP HP Average Precision: 0.4325 0.1280 0.6082 0.5613 Success@1: 0.3733 0.1733 0.4933 0.4533 Success@5: 0.6889 0.5200 0.7867 0.7600 Success@10: 0.7689 0.6667 0.8400 0.8000 Precision @ 10 docs: 0.1773 Precision @ “R” docs: 0.3657 0.1538 0.4867 0.4567 Mean repirocal rank: 0.5124 0.3442 0.6193 0.5736 Topics with no relevant found: 3 0 2 1

Summary Statistics Run ID: uogWebCAU150 Run Description AnchorText-NoLinkStruct, DocStruct, URLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222611 74186 73941 74484 Relevant: 1763 1600 80 83 Rel-ret: 1290 1130 78 82 Official task measures All topics TD NP HP Average Precision: 0.3478 0.1791 0.3324 0.5318 Success@1: 0.3378 0.5067 0.1333 0.3733 Success@5: 0.7111 0.7733 0.6133 0.7467 Success@10: 0.8444 0.8933 0.8133 0.8267 Precision @ 10 docs: 0.2493 Precision @ “R” docs: 0.2399 0.2030 0.1333 0.3833 Mean repirocal rank: 0.5010 0.6257 0.3401 0.5372 Topics with no relevant found: 3 0 2 1

Web Track, mixed-query task results — University of Glasgow

Summary Statistics Run ID: uogWebSelAn Run Description AnchorText-NoLinkStruct, DocStruct, URLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222611 74186 73941 74484 Relevant: 1763 1600 80 83 Rel-ret: 1288 1128 78 82 Official task measures All topics TD NP HP Average Precision: 0.4576 0.1655 0.6042 0.6031 Success@1: 0.4444 0.3600 0.4933 0.4800 Success@5: 0.7600 0.6800 0.7867 0.8133 Success@10: 0.8178 0.7733 0.8400 0.8400 Precision @ 10 docs: 0.2120 Precision @ “R” docs: 0.3873 0.1852 0.4867 0.4900 Mean repirocal rank: 0.5798 0.5066 0.6154 0.6174 Topics with no relevant found: 3 0 2 1

Summary Statistics Run ID: uogWebSelL Run Description AnchorText-LinkStruct, DocStruct, URLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222611 74186 73941 74484 Relevant: 1763 1600 80 83 Rel-ret: 1291 1131 78 82 Official task measures All topics TD NP HP Average Precision: 0.3895 0.1625 0.4279 0.5780 Success@1: 0.3467 0.3733 0.2400 0.4267 Success@5: 0.7289 0.6933 0.6933 0.8000 Success@10: 0.8089 0.7867 0.8000 0.8400 Precision @ 10 docs: 0.2240 Precision @ “R” docs: 0.2813 0.1871 0.2267 0.4300 Mean repirocal rank: 0.5116 0.5143 0.4372 0.5834 Topics with no relevant found: 3 0 2 1

Web Track, mixed-query task results — University of Glasgow

Summary Statistics Run ID: uogWebSelAnL Run Description AnchorText-LinkStruct, DocStruct, URLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222611 74186 73941 74484 Relevant: 1763 1600 80 83 Rel-ret: 1286 1126 78 82 Official task measures All topics TD NP HP Average Precision: 0.4569 0.1521 0.6082 0.6104 Success@1: 0.4267 0.2933 0.4933 0.4933 Success@5: 0.7422 0.6267 0.7867 0.8133 Success@10: 0.8000 0.7200 0.8400 0.8400 Precision @ 10 docs: 0.2027 Precision @ “R” docs: 0.3859 0.1745 0.4867 0.4967 Mean repirocal rank: 0.5636 0.4466 0.6193 0.6248 Topics with no relevant found: 3 0 2 1