Web Track, mixed-query task results — Chinese Academy of Sciences (CAS-ICT)

Summary Statistics Run ID: ICT04MNZ3 Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222700 74188 73947 74565 Relevant: 1763 1600 80 83 Rel-ret: 1260 1100 79 81 Official task measures All topics TD NP HP Average Precision: 0.4279 0.1369 0.5939 0.5530 Success@1: 0.4400 0.3600 0.4933 0.4667 Success@5: 0.6889 0.6533 0.7600 0.6533 Success@10: 0.7689 0.7467 0.8133 0.7467 Precision @ 10 docs: 0.2027 Precision @ “R” docs: 0.3665 0.1607 0.4822 0.4567 Mean repirocal rank: 0.5521 0.4896 0.6034 0.5633 Topics with no relevant found: 2 0 0 2

Summary Statistics Run ID: ICT04basic Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222633 74186 73932 74515 Relevant: 1763 1600 80 83 Rel-ret: 1203 1046 77 80 Official task measures All topics TD NP HP Average Precision: 0.3976 0.1267 0.5341 0.5319 Success@1: 0.3956 0.3333 0.4133 0.4400 Success@5: 0.6489 0.5867 0.7067 0.6533 Success@10: 0.7467 0.6933 0.8400 0.7067 Precision @ 10 docs: 0.1787 Precision @ “R” docs: 0.3306 0.1406 0.4111 0.4400 Mean repirocal rank: 0.5139 0.4580 0.5412 0.5424 Topics with no relevant found: 6 0 3 3

Web Track, mixed-query task results — Chinese Academy of Sciences (CAS-ICT)

Summary Statistics Run ID: ICT04CIIS1AT Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222700 74188 73947 74565 Relevant: 1763 1600 80 83 Rel-ret: 1252 1092 79 81 Official task measures All topics TD NP HP Average Precision: 0.4250 0.1410 0.6004 0.5337 Success@1: 0.4178 0.3333 0.4800 0.4400 Success@5: 0.6889 0.6400 0.7600 0.6667 Success@10: 0.8044 0.7867 0.8800 0.7467 Precision @ 10 docs: 0.2080 Precision @ “R” docs: 0.3584 0.1675 0.4778 0.4300 Mean repirocal rank: 0.5405 0.4705 0.6064 0.5446 Topics with no relevant found: 2 0 0 2

Summary Statistics Run ID: ICT04CIILC Run Description AnchorText-NoLinkStruct, DocStruct, NoURLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 222633 74186 73932 74515 Relevant: 1763 1600 80 83 Rel-ret: 1224 1067 77 80 Official task measures All topics TD NP HP Average Precision: 0.3958 0.1352 0.5226 0.5297 Success@1: 0.4000 0.3733 0.4000 0.4267 Success@5: 0.6311 0.6000 0.6533 0.6400 Success@10: 0.7600 0.7333 0.8133 0.7333 Precision @ 10 docs: 0.1893 Precision @ “R” docs: 0.3206 0.1473 0.3978 0.4167 Mean repirocal rank: 0.5202 0.4924 0.5302 0.5379 Topics with no relevant found: 5 0 2 3

Web Track, mixed-query task results — Chinese Academy of Sciences (CAS-ICT)

Summary Statistics Run ID: ICT04RULE Run Description AnchorText-NoLinkStruct, DocStruct, URLLength-URLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 205382 68596 68166 68620 Relevant: 1763 1600 80 83 Rel-ret: 1063 915 76 72 Official task measures All topics TD NP HP Average Precision: 0.4219 0.1331 0.6003 0.5323 Success@1: 0.4178 0.3333 0.4800 0.4400 Success@5: 0.6889 0.6400 0.7600 0.6667 Success@10: 0.8044 0.7867 0.8800 0.7467 Precision @ 10 docs: 0.2080 Precision @ “R” docs: 0.3577 0.1654 0.4778 0.4300 Mean repirocal rank: 0.5400 0.4706 0.6063 0.5432 Topics with no relevant found: 14 1 3 10