Terabyte Track results — Dublin City University

Summary Statistics Run ID DcuTB04Ucd1 Run Type automatic Fields Used title, description, narrative Run Description NoLinksUsed-AnchorTextUsed- NoDocStructUsed Time to index 53025 min. Time to retrieve top 20 per query 84 sec. System RAM 9 GB Size of on-disk structures 65 GB Approx system cost $18250 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 3060

Recall Level Averages Recall Precision 0.00 0.4457 0.10 0.2167 0.20 0.1497 0.30 0.1108 0.40 0.0802 0.50 0.0407 0.60 0.0275 0.70 0.0129 0.80 0.0028 0.90 0.0000 1.00 0.0000 Mean average precision non-interpolated 0.0762

Document Level Averages Precision At 5 docs 0.2571 At 10 docs 0.2347 At 15 docs 0.2367 At 20 docs 0.2306 At 30 docs 0.2190 At 100 docs 0.1753 At 200 docs 0.1311 At 500 docs 0.0870 At 1000 docs 0.0624 R-Precision: precision after R (number relevant) documents retrieved Exact 0.1306

Terabyte Track results — Dublin City University

Summary Statistics Run ID DcuTB04Base Run Type automatic Fields Used title Run Description NoLinksUsed-NoAnchorTextUsed- NoDocStructUsed Time to index 24524 min. Time to retrieve top 20 per query 2 sec. System RAM 4 GB Size of on-disk structures 64 GB Approx system cost $10500 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 3889

Recall Level Averages Recall Precision 0.00 0.5872 0.10 0.3246 0.20 0.2457 0.30 0.1856 0.40 0.1245 0.50 0.0744 0.60 0.0452 0.70 0.0192 0.80 0.0092 0.90 0.0025 1.00 0.0000 Mean average precision non-interpolated 0.1183

Document Level Averages Precision At 5 docs 0.3429 At 10 docs 0.3531 At 15 docs 0.3265 At 20 docs 0.3122 At 30 docs 0.3027 At 100 docs 0.2447 At 200 docs 0.1896 At 500 docs 0.1215 At 1000 docs 0.0794 R-Precision: precision after R (number relevant) documents retrieved Exact 0.1891

Terabyte Track results — Dublin City University

Summary Statistics Run ID DcuTB04Ucd2 Run Type automatic Fields Used title, description, narrative Run Description NoLinksUsed-AnchorTextUsed- NoDocStructUsed Time to index 27451 min. Time to retrieve top 20 per query 15 sec. System RAM 9 GB Size of on-disk structures 65 GB Approx system cost $18250 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 3040

Recall Level Averages Recall Precision 0.00 0.4259 0.10 0.2175 0.20 0.1500 0.30 0.0952 0.40 0.0674 0.50 0.0416 0.60 0.0237 0.70 0.0129 0.80 0.0029 0.90 0.0000 1.00 0.0000 Mean average precision non-interpolated 0.0696

Document Level Averages Precision At 5 docs 0.1633 At 10 docs 0.1959 At 15 docs 0.2177 At 20 docs 0.2276 At 30 docs 0.2422 At 100 docs 0.1786 At 200 docs 0.1301 At 500 docs 0.0873 At 1000 docs 0.0620 R-Precision: precision after R (number relevant) documents retrieved Exact 0.1287

Terabyte Track results — Dublin City University

Summary Statistics Run ID DcuTB04Wbm25 Run Type automatic Fields Used title Run Description NoLinksUsed-NoAnchorTextUsed- DocStructUsed Time to index 45648 min. Time to retrieve top 20 per query 2 sec. System RAM 4 GB Size of on-disk structures 64 GB Approx system cost $10500 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 3077

Recall Level Averages Recall Precision 0.00 0.4744 0.10 0.2335 0.20 0.1692 0.30 0.1154 0.40 0.0689 0.50 0.0388 0.60 0.0311 0.70 0.0149 0.80 0.0095 0.90 0.0031 1.00 0.0000 Mean average precision non-interpolated 0.0790

Document Level Averages Precision At 5 docs 0.2327 At 10 docs 0.2306 At 15 docs 0.2245 At 20 docs 0.2224 At 30 docs 0.2150 At 100 docs 0.1782 At 200 docs 0.1430 At 500 docs 0.0952 At 1000 docs 0.0628 R-Precision: precision after R (number relevant) documents retrieved Exact 0.1462

Terabyte Track results — Dublin City University

Summary Statistics Run ID DcuTB04Combo Run Type automatic Fields Used title Run Description NoLinksUsed-AnchorTextUsed- DocStructUsed Time to index 54360 min. Time to retrieve top 20 per query 2 sec. System RAM 7 GB Size of on-disk structures 69 GB Approx system cost $16250 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 2521

Recall Level Averages Recall Precision 0.00 0.3359 0.10 0.0963 0.20 0.0733 0.30 0.0504 0.40 0.0319 0.50 0.0145 0.60 0.0080 0.70 0.0059 0.80 0.0024 0.90 0.0000 1.00 0.0000 Mean average precision non-interpolated 0.0328

Document Level Averages Precision At 5 docs 0.1224 At 10 docs 0.1163 At 15 docs 0.1265 At 20 docs 0.1194 At 30 docs 0.1116 At 100 docs 0.0863 At 200 docs 0.0753 At 500 docs 0.0651 At 1000 docs 0.0514 R-Precision: precision after R (number relevant) documents retrieved Exact 0.0731