Terabyte Track results — Dublin City University

Summary Statistics Run ID DcuTB04Ucd1 Run Type automatic Fields Used title, description, narrative Run Description NoLinksUsed-AnchorTextUsed- NoDocStructUsed Time to index 53025 min. Time to retrieve top 20 per query 84 sec. System RAM 9 GB Size of on-disk structures 65 GB Approx system cost $18250 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 3060

Recall Level Averages Recall Precision 0.00 0.4457 0.10 0.2167 0.20 0.1497 0.30 0.1108 0.40 0.0802 0.50 0.0407 0.60 0.0275 0.70 0.0129 0.80 0.0028 0.90 0.0000 1.00 0.0000 Mean average precision non-interpolated 0.0762

Document Level Averages Precision At 5 docs 0.2571 At 10 docs 0.2347 At 15 docs 0.2367 At 20 docs 0.2306 At 30 docs 0.2190 At 100 docs 0.1753 At 200 docs 0.1311 At 500 docs 0.0870 At 1000 docs 0.0624 R-Precision: precision after R (number relevant) documents retrieved Exact 0.1306