Robust track results — Virginia Tech

Summary Statistics Run ID vtumtitle Run Description: Automatic run, title only Kendall τ of difficulty predictions: 0.437

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9275 1545 2082 10820 Mean average precision 0.2781 0.2988 0.1362 0.2822 % topics with no relevant in top 10 20.5 14.3 36.0 19.3 area under MAP(X) curve 0.0069 0.0147 0.0009 0.0077

Document Level Averages Precision Old New Hard All At 5 docs 0.4840 0.4735 0.2920 0.4819 At 10 docs 0.4395 0.4286 0.2720 0.4373 At 15 docs 0.4037 0.3986 0.2520 0.4027 At 20 docs 0.3750 0.3592 0.2420 0.3719 At 30 docs 0.3287 0.3102 0.2247 0.3250 At 100 docs 0.1936 0.1810 0.1436 0.1912 At 200 docs 0.1335 0.1151 0.1035 0.1299 At 500 docs 0.0765 0.0559 0.0658 0.0724 At 1000 docs 0.0464 0.0315 0.0416 0.0435 R-Precision Exact 0.3066 0.3208 0.1794 0.3094