Robust track results — Virginia Tech

Summary Statistics Run ID vtumlong436 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.449

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10404 1710 2453 12114 Mean average precision 0.3202 0.3595 0.1516 0.3280 % topics with no relevant in top 10 7.0 6.1 10.0 6.8 area under MAP(X) curve 0.0229 0.0449 0.0108 0.0248

Document Level Averages Precision Old New Hard All At 5 docs 0.5710 0.5714 0.3880 0.5711 At 10 docs 0.5175 0.4939 0.3480 0.5129 At 15 docs 0.4687 0.4490 0.3160 0.4648 At 20 docs 0.4285 0.4082 0.2910 0.4245 At 30 docs 0.3715 0.3531 0.2633 0.3679 At 100 docs 0.2208 0.2055 0.1738 0.2178 At 200 docs 0.1526 0.1329 0.1270 0.1487 At 500 docs 0.0855 0.0632 0.0754 0.0811 At 1000 docs 0.0520 0.0349 0.0491 0.0487 R-Precision Exact 0.3395 0.3746 0.1994 0.3464