Robust track results — Virginia Tech

Summary Statistics Run ID vtumlong432 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.453

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10379 1709 2436 12088 Mean average precision 0.3199 0.3586 0.1499 0.3275 % topics with no relevant in top 10 7.0 6.1 10.0 6.8 area under MAP(X) curve 0.0229 0.0457 0.0112 0.0249

Document Level Averages Precision Old New Hard All At 5 docs 0.5730 0.5714 0.3800 0.5727 At 10 docs 0.5110 0.5020 0.3360 0.5092 At 15 docs 0.4673 0.4490 0.3200 0.4637 At 20 docs 0.4308 0.4102 0.2980 0.4267 At 30 docs 0.3693 0.3565 0.2600 0.3668 At 100 docs 0.2213 0.2051 0.1736 0.2181 At 200 docs 0.1521 0.1320 0.1258 0.1482 At 500 docs 0.0851 0.0629 0.0745 0.0808 At 1000 docs 0.0519 0.0349 0.0487 0.0485 R-Precision Exact 0.3378 0.3730 0.2001 0.3448