Robust track results — Virginia Tech

Summary Statistics Run ID vtumlong348 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.446

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10363 1660 2461 12023 Mean average precision 0.3200 0.3582 0.1492 0.3275 % topics with no relevant in top 10 6.0 6.1 8.0 6.0 area under MAP(X) curve 0.0235 0.0377 0.0147 0.0245

Document Level Averages Precision Old New Hard All At 5 docs 0.5760 0.5592 0.3960 0.5727 At 10 docs 0.5110 0.5061 0.3420 0.5100 At 15 docs 0.4620 0.4571 0.3107 0.4610 At 20 docs 0.4282 0.4163 0.2950 0.4259 At 30 docs 0.3698 0.3639 0.2627 0.3687 At 100 docs 0.2195 0.1994 0.1764 0.2155 At 200 docs 0.1513 0.1296 0.1262 0.1470 At 500 docs 0.0852 0.0616 0.0757 0.0805 At 1000 docs 0.0518 0.0339 0.0492 0.0483 R-Precision Exact 0.3391 0.3650 0.1965 0.3442