Robust track results — Virginia Tech

Summary Statistics Run ID vtumlong344 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.448

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10380 1663 2461 12043 Mean average precision 0.3201 0.3579 0.1508 0.3275 % topics with no relevant in top 10 7.5 6.1 10.0 7.2 area under MAP(X) curve 0.0236 0.0367 0.0149 0.0245

Document Level Averages Precision Old New Hard All At 5 docs 0.5780 0.5551 0.4040 0.5735 At 10 docs 0.5090 0.5020 0.3340 0.5076 At 15 docs 0.4657 0.4558 0.3160 0.4637 At 20 docs 0.4305 0.4214 0.2950 0.4287 At 30 docs 0.3698 0.3626 0.2600 0.3684 At 100 docs 0.2193 0.2008 0.1774 0.2157 At 200 docs 0.1515 0.1290 0.1273 0.1471 At 500 docs 0.0851 0.0611 0.0756 0.0804 At 1000 docs 0.0519 0.0339 0.0492 0.0484 R-Precision Exact 0.3394 0.3693 0.1968 0.3453