Robust track results — Virginia Tech

Summary Statistics Run ID vtumlong254 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.423

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10371 1650 2428 12021 Mean average precision 0.3193 0.3493 0.1619 0.3252 % topics with no relevant in top 10 8.5 6.1 16.0 8.0 area under MAP(X) curve 0.0251 0.0356 0.0137 0.0261

Document Level Averages Precision Old New Hard All At 5 docs 0.5780 0.5510 0.4040 0.5727 At 10 docs 0.5145 0.4980 0.3460 0.5112 At 15 docs 0.4690 0.4408 0.3240 0.4635 At 20 docs 0.4305 0.4082 0.3000 0.4261 At 30 docs 0.3680 0.3605 0.2627 0.3665 At 100 docs 0.2221 0.1996 0.1790 0.2177 At 200 docs 0.1523 0.1282 0.1276 0.1476 At 500 docs 0.0857 0.0606 0.0759 0.0807 At 1000 docs 0.0519 0.0337 0.0486 0.0483 R-Precision Exact 0.3396 0.3709 0.2018 0.3458