Robust track results — Virginia Tech

Summary Statistics Run ID vtumlong252 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.419

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10363 1647 2417 12010 Mean average precision 0.3187 0.3485 0.1617 0.3246 % topics with no relevant in top 10 8.5 6.1 16.0 8.0 area under MAP(X) curve 0.0256 0.0351 0.0136 0.0266

Document Level Averages Precision Old New Hard All At 5 docs 0.5770 0.5592 0.4000 0.5735 At 10 docs 0.5155 0.4918 0.3440 0.5108 At 15 docs 0.4677 0.4395 0.3187 0.4621 At 20 docs 0.4297 0.4061 0.3030 0.4251 At 30 docs 0.3672 0.3585 0.2633 0.3655 At 100 docs 0.2222 0.1992 0.1792 0.2176 At 200 docs 0.1520 0.1280 0.1277 0.1473 At 500 docs 0.0854 0.0607 0.0757 0.0805 At 1000 docs 0.0518 0.0336 0.0483 0.0482 R-Precision Exact 0.3395 0.3682 0.2032 0.3451