Robust track results — Virginia Tech

Summary Statistics Run ID vtumdesc Run Description: Automatic run, description only Kendall τ of difficulty predictions: 0.446

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9181 1621 2184 10802 Mean average precision 0.2833 0.3403 0.1320 0.2945 % topics with no relevant in top 10 15.5 12.2 20.0 14.9 area under MAP(X) curve 0.0075 0.0213 0.0047 0.0081

Document Level Averages Precision Old New Hard All At 5 docs 0.4980 0.5429 0.3080 0.5068 At 10 docs 0.4490 0.4776 0.3040 0.4546 At 15 docs 0.4090 0.4286 0.2787 0.4128 At 20 docs 0.3755 0.3908 0.2590 0.3785 At 30 docs 0.3228 0.3401 0.2227 0.3262 At 100 docs 0.1969 0.1937 0.1522 0.1962 At 200 docs 0.1353 0.1238 0.1098 0.1331 At 500 docs 0.0756 0.0599 0.0662 0.0725 At 1000 docs 0.0459 0.0331 0.0437 0.0434 R-Precision Exact 0.3045 0.3602 0.1863 0.3155