Robust track results — University of Glasgow

Summary Statistics Run ID uogRobSWR5 Run Description: Automatic run, title only Kendall τ of difficulty predictions: 0.257

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9921 1655 2233 11576 Mean average precision 0.2911 0.3272 0.1305 0.2982 % topics with no relevant in top 10 17.5 16.3 30.0 17.3 area under MAP(X) curve 0.0072 0.0176 0.0013 0.0075

Document Level Averages Precision Old New Hard All At 5 docs 0.5040 0.5306 0.3400 0.5092 At 10 docs 0.4455 0.4571 0.2780 0.4478 At 15 docs 0.4147 0.3959 0.2600 0.4110 At 20 docs 0.3835 0.3643 0.2480 0.3797 At 30 docs 0.3362 0.3292 0.2140 0.3348 At 100 docs 0.2097 0.1914 0.1454 0.2061 At 200 docs 0.1458 0.1248 0.1068 0.1417 At 500 docs 0.0825 0.0611 0.0700 0.0783 At 1000 docs 0.0496 0.0338 0.0447 0.0465 R-Precision Exact 0.3093 0.3461 0.1705 0.3166