Robust track results — University of Glasgow

Summary Statistics Run ID uogRobSWR10 Run Description: Automatic run, title only Kendall τ of difficulty predictions: 0.270

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10004 1732 2324 11736 Mean average precision 0.2961 0.3216 0.1360 0.3011 % topics with no relevant in top 10 16.0 12.2 26.0 15.3 area under MAP(X) curve 0.0097 0.0215 0.0025 0.0106

Document Level Averages Precision Old New Hard All At 5 docs 0.5130 0.5224 0.3760 0.5149 At 10 docs 0.4605 0.4531 0.3160 0.4590 At 15 docs 0.4210 0.4000 0.2827 0.4169 At 20 docs 0.3887 0.3684 0.2650 0.3847 At 30 docs 0.3393 0.3326 0.2273 0.3380 At 100 docs 0.2145 0.1906 0.1534 0.2098 At 200 docs 0.1481 0.1281 0.1116 0.1441 At 500 docs 0.0838 0.0633 0.0732 0.0798 At 1000 docs 0.0500 0.0353 0.0465 0.0471 R-Precision Exact 0.3148 0.3410 0.1787 0.3199