Robust track results — University of Glasgow

Summary Statistics Run ID uogRobSBase Run Description: Automatic run, title only Kendall τ of difficulty predictions: 0.259

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9904 1782 2270 11686 Mean average precision 0.2826 0.3482 0.1237 0.2955 % topics with no relevant in top 10 16.0 14.3 28.0 15.7 area under MAP(X) curve 0.0087 0.0265 0.0030 0.0098

Document Level Averages Precision Old New Hard All At 5 docs 0.4810 0.5510 0.2720 0.4948 At 10 docs 0.4400 0.4816 0.2640 0.4482 At 15 docs 0.4103 0.4408 0.2600 0.4163 At 20 docs 0.3720 0.4031 0.2430 0.3781 At 30 docs 0.3278 0.3571 0.2107 0.3336 At 100 docs 0.2053 0.2018 0.1450 0.2046 At 200 docs 0.1450 0.1306 0.1111 0.1421 At 500 docs 0.0821 0.0660 0.0695 0.0789 At 1000 docs 0.0495 0.0364 0.0454 0.0469 R-Precision Exact 0.3051 0.3687 0.1807 0.3176