Robust track results — University of Glasgow

Summary Statistics Run ID uogRobLWR5 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.172

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10214 1838 2452 12052 Mean average precision 0.3028 0.3703 0.1608 0.3161 % topics with no relevant in top 10 13.0 4.1 20.0 11.2 area under MAP(X) curve 0.0134 0.0388 0.0060 0.0158

Document Level Averages Precision Old New Hard All At 5 docs 0.5410 0.5959 0.3600 0.5518 At 10 docs 0.4800 0.5122 0.3180 0.4863 At 15 docs 0.4383 0.4571 0.2893 0.4420 At 20 docs 0.4072 0.4224 0.2770 0.4102 At 30 docs 0.3540 0.3707 0.2493 0.3573 At 100 docs 0.2149 0.2184 0.1730 0.2156 At 200 docs 0.1504 0.1386 0.1256 0.1481 At 500 docs 0.0845 0.0674 0.0745 0.0812 At 1000 docs 0.0511 0.0375 0.0490 0.0484 R-Precision Exact 0.3170 0.3828 0.2020 0.3300