Robust track results — University of Glasgow

Summary Statistics Run ID uogRobLWR10 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.176

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10270 1746 2483 12016 Mean average precision 0.3084 0.3679 0.1571 0.3201 % topics with no relevant in top 10 12.5 6.1 20.0 11.2 area under MAP(X) curve 0.0133 0.0295 0.0061 0.0148

Document Level Averages Precision Old New Hard All At 5 docs 0.5460 0.6000 0.3680 0.5566 At 10 docs 0.4815 0.5143 0.3120 0.4880 At 15 docs 0.4407 0.4599 0.2933 0.4444 At 20 docs 0.4105 0.4173 0.2770 0.4118 At 30 docs 0.3587 0.3633 0.2527 0.3596 At 100 docs 0.2203 0.2080 0.1788 0.2178 At 200 docs 0.1532 0.1324 0.1300 0.1491 At 500 docs 0.0848 0.0635 0.0757 0.0806 At 1000 docs 0.0513 0.0356 0.0497 0.0483 R-Precision Exact 0.3243 0.3756 0.1962 0.3344