Robust track results — University of Glasgow

Summary Statistics Run ID uogRobLBase Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.163

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 10027 1824 2405 11851 Mean average precision 0.2927 0.3586 0.1609 0.3056 % topics with no relevant in top 10 15.5 6.1 30.0 13.7 area under MAP(X) curve 0.0130 0.0325 0.0037 0.0150

Document Level Averages Precision Old New Hard All At 5 docs 0.5310 0.5551 0.3480 0.5357 At 10 docs 0.4715 0.4939 0.3100 0.4759 At 15 docs 0.4350 0.4503 0.2893 0.4380 At 20 docs 0.3980 0.4143 0.2780 0.4012 At 30 docs 0.3540 0.3619 0.2567 0.3556 At 100 docs 0.2119 0.2092 0.1728 0.2114 At 200 docs 0.1473 0.1331 0.1246 0.1445 At 500 docs 0.0828 0.0657 0.0743 0.0795 At 1000 docs 0.0501 0.0372 0.0481 0.0476 R-Precision Exact 0.3136 0.3721 0.1997 0.3252