Robust track results — University of Glasgow

Summary Statistics Run ID uogRobDWR5 Run Description: Automatic run, description only Kendall τ of difficulty predictions: 0.259

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9485 1744 2130 11229 Mean average precision 0.2822 0.3834 0.1328 0.3021 % topics with no relevant in top 10 15.5 12.2 20.0 14.9 area under MAP(X) curve 0.0070 0.0234 0.0032 0.0079

Document Level Averages Precision Old New Hard All At 5 docs 0.4950 0.6571 0.3520 0.5269 At 10 docs 0.4460 0.5408 0.3040 0.4647 At 15 docs 0.4097 0.4708 0.2760 0.4217 At 20 docs 0.3760 0.4163 0.2500 0.3839 At 30 docs 0.3308 0.3769 0.2347 0.3399 At 100 docs 0.2011 0.2133 0.1552 0.2035 At 200 docs 0.1396 0.1326 0.1136 0.1382 At 500 docs 0.0784 0.0650 0.0674 0.0758 At 1000 docs 0.0474 0.0356 0.0426 0.0451 R-Precision Exact 0.3027 0.3749 0.1751 0.3169