Robust track results — University of Glasgow

Summary Statistics Run ID uogRobDWR10 Run Description: Automatic run, description only Kendall τ of difficulty predictions: 0.240

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9490 1740 2026 11230 Mean average precision 0.2861 0.3736 0.1308 0.3033 % topics with no relevant in top 10 16.0 12.2 28.0 15.3 area under MAP(X) curve 0.0072 0.0227 0.0019 0.0083

Document Level Averages Precision Old New Hard All At 5 docs 0.5010 0.6367 0.3320 0.5277 At 10 docs 0.4535 0.5286 0.2960 0.4683 At 15 docs 0.4127 0.4667 0.2720 0.4233 At 20 docs 0.3785 0.4224 0.2480 0.3871 At 30 docs 0.3312 0.3721 0.2260 0.3392 At 100 docs 0.2045 0.2110 0.1498 0.2058 At 200 docs 0.1406 0.1328 0.1085 0.1390 At 500 docs 0.0791 0.0647 0.0642 0.0762 At 1000 docs 0.0475 0.0355 0.0405 0.0451 R-Precision Exact 0.3067 0.3774 0.1694 0.3206