Robust track results — University of Glasgow

Summary Statistics Run ID uogRobDBase Run Description: Automatic run, description only Kendall τ of difficulty predictions: 0.258

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9290 1757 2081 11047 Mean average precision 0.2732 0.3888 0.1230 0.2959 % topics with no relevant in top 10 19.0 12.2 30.0 17.7 area under MAP(X) curve 0.0062 0.0259 0.0033 0.0070

Document Level Averages Precision Old New Hard All At 5 docs 0.4720 0.6408 0.3080 0.5052 At 10 docs 0.4305 0.5510 0.3000 0.4542 At 15 docs 0.3897 0.4830 0.2680 0.4080 At 20 docs 0.3585 0.4480 0.2370 0.3761 At 30 docs 0.3157 0.3878 0.2087 0.3298 At 100 docs 0.1948 0.2118 0.1442 0.1982 At 200 docs 0.1360 0.1340 0.1094 0.1356 At 500 docs 0.0768 0.0648 0.0653 0.0744 At 1000 docs 0.0464 0.0359 0.0416 0.0444 R-Precision Exact 0.2875 0.3949 0.1633 0.3086