Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04oktwo Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.070

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9603 1587 2195 11190 Mean average precision 0.2734 0.3109 0.1191 0.2808 % topics with no relevant in top 10 6.5 8.2 16.0 6.8 area under MAP(X) curve 0.0237 0.0335 0.0172 0.0242

Document Level Averages Precision Old New Hard All At 5 docs 0.5240 0.5143 0.3320 0.5221 At 10 docs 0.4670 0.4571 0.2880 0.4651 At 15 docs 0.4253 0.3973 0.2747 0.4198 At 20 docs 0.3933 0.3776 0.2660 0.3902 At 30 docs 0.3380 0.3279 0.2333 0.3360 At 100 docs 0.1993 0.1847 0.1490 0.1964 At 200 docs 0.1371 0.1173 0.1093 0.1332 At 500 docs 0.0769 0.0572 0.0667 0.0730 At 1000 docs 0.0480 0.0324 0.0439 0.0449 R-Precision Exact 0.3121 0.3508 0.1783 0.3197