Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04okdiv Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.080

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9516 1585 2178 11101 Mean average precision 0.2677 0.2941 0.1187 0.2729 % topics with no relevant in top 10 6.0 10.2 12.0 6.8 area under MAP(X) curve 0.0229 0.0302 0.0164 0.0231

Document Level Averages Precision Old New Hard All At 5 docs 0.5110 0.5020 0.3040 0.5092 At 10 docs 0.4535 0.4388 0.2860 0.4506 At 15 docs 0.4130 0.3687 0.2600 0.4043 At 20 docs 0.3860 0.3571 0.2510 0.3803 At 30 docs 0.3313 0.3170 0.2207 0.3285 At 100 docs 0.1992 0.1806 0.1504 0.1956 At 200 docs 0.1369 0.1132 0.1103 0.1322 At 500 docs 0.0761 0.0554 0.0657 0.0720 At 1000 docs 0.0476 0.0323 0.0436 0.0446 R-Precision Exact 0.3095 0.3349 0.1836 0.3145