Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04okall Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.077

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9394 1601 2150 10995 Mean average precision 0.2699 0.3103 0.1172 0.2778 % topics with no relevant in top 10 7.5 6.1 18.0 7.2 area under MAP(X) curve 0.0232 0.0343 0.0159 0.0239

Document Level Averages Precision Old New Hard All At 5 docs 0.5200 0.5143 0.3240 0.5189 At 10 docs 0.4635 0.4571 0.2780 0.4622 At 15 docs 0.4223 0.4041 0.2773 0.4187 At 20 docs 0.3877 0.3765 0.2580 0.3855 At 30 docs 0.3348 0.3286 0.2267 0.3336 At 100 docs 0.1991 0.1859 0.1468 0.1965 At 200 docs 0.1368 0.1168 0.1077 0.1329 At 500 docs 0.0766 0.0578 0.0660 0.0729 At 1000 docs 0.0470 0.0327 0.0430 0.0442 R-Precision Exact 0.3112 0.3514 0.1771 0.3191