Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04clus9 Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.008

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 11575 1594 2793 13169 Mean average precision 0.2946 0.2790 0.1479 0.2915 % topics with no relevant in top 10 8.5 10.2 14.0 8.8 area under MAP(X) curve 0.0395 0.0266 0.0265 0.0360

Document Level Averages Precision Old New Hard All At 5 docs 0.5170 0.4327 0.3280 0.5004 At 10 docs 0.4505 0.3980 0.2820 0.4402 At 15 docs 0.4097 0.3592 0.2653 0.3997 At 20 docs 0.3788 0.3357 0.2490 0.3703 At 30 docs 0.3267 0.3075 0.2267 0.3229 At 100 docs 0.2023 0.1706 0.1516 0.1961 At 200 docs 0.1525 0.1041 0.1320 0.1430 At 500 docs 0.1044 0.0549 0.0978 0.0946 At 1000 docs 0.0579 0.0325 0.0559 0.0529 R-Precision Exact 0.3221 0.3212 0.1922 0.3219