Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04SemLM Run Description: Automatic run, title+desc Kendall τ of difficulty predictions: -0.337

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9079 1564 2110 10643 Mean average precision 0.2683 0.3076 0.1146 0.2760 % topics with no relevant in top 10 7.0 10.2 10.0 7.6 area under MAP(X) curve 0.0173 0.0319 0.0118 0.0182

Document Level Averages Precision Old New Hard All At 5 docs 0.5240 0.5592 0.3360 0.5309 At 10 docs 0.4510 0.4653 0.2900 0.4538 At 15 docs 0.4100 0.4150 0.2547 0.4110 At 20 docs 0.3780 0.3765 0.2340 0.3777 At 30 docs 0.3253 0.3340 0.2153 0.3270 At 100 docs 0.1893 0.1798 0.1442 0.1874 At 200 docs 0.1310 0.1150 0.1046 0.1279 At 500 docs 0.0745 0.0575 0.0650 0.0711 At 1000 docs 0.0454 0.0319 0.0422 0.0427 R-Precision Exact 0.3023 0.3377 0.1727 0.3092