Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04OKapi Run Description: Automatic run, description only Kendall τ of difficulty predictions: -0.238

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 8920 1528 1950 10448 Mean average precision 0.2569 0.2811 0.1146 0.2617 % topics with no relevant in top 10 8.0 6.1 8.0 7.6 area under MAP(X) curve 0.0199 0.0248 0.0134 0.0200

Document Level Averages Precision Old New Hard All At 5 docs 0.5200 0.4939 0.3240 0.5149 At 10 docs 0.4510 0.4184 0.2960 0.4446 At 15 docs 0.4037 0.3674 0.2653 0.3965 At 20 docs 0.3720 0.3418 0.2520 0.3661 At 30 docs 0.3232 0.3014 0.2273 0.3189 At 100 docs 0.1885 0.1659 0.1396 0.1841 At 200 docs 0.1316 0.1057 0.1007 0.1265 At 500 docs 0.0730 0.0538 0.0594 0.0692 At 1000 docs 0.0446 0.0312 0.0390 0.0420 R-Precision Exact 0.2944 0.3169 0.1703 0.2988