Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04NcA Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: -0.011

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9420 1555 2150 10975 Mean average precision 0.2772 0.3084 0.1166 0.2833 % topics with no relevant in top 10 7.0 10.2 10.0 7.6 area under MAP(X) curve 0.0207 0.0321 0.0161 0.0210

Document Level Averages Precision Old New Hard All At 5 docs 0.5260 0.5633 0.3280 0.5333 At 10 docs 0.4640 0.4694 0.2960 0.4651 At 15 docs 0.4160 0.4163 0.2587 0.4161 At 20 docs 0.3830 0.3765 0.2410 0.3817 At 30 docs 0.3288 0.3347 0.2100 0.3300 At 100 docs 0.1953 0.1806 0.1480 0.1924 At 200 docs 0.1366 0.1170 0.1084 0.1327 At 500 docs 0.0785 0.0565 0.0678 0.0741 At 1000 docs 0.0471 0.0317 0.0430 0.0441 R-Precision Exact 0.3124 0.3418 0.1755 0.3182