Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04LMts Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.085

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 7842 1485 1743 9327 Mean average precision 0.2349 0.2800 0.0944 0.2438 % topics with no relevant in top 10 9.0 8.2 22.0 8.8 area under MAP(X) curve 0.0135 0.0225 0.0079 0.0141

Document Level Averages Precision Old New Hard All At 5 docs 0.4750 0.4939 0.2880 0.4787 At 10 docs 0.4130 0.4163 0.2540 0.4137 At 15 docs 0.3813 0.3687 0.2320 0.3788 At 20 docs 0.3503 0.3480 0.2200 0.3498 At 30 docs 0.3072 0.3020 0.2020 0.3062 At 100 docs 0.1785 0.1716 0.1354 0.1771 At 200 docs 0.1209 0.1082 0.0983 0.1184 At 500 docs 0.0657 0.0532 0.0558 0.0632 At 1000 docs 0.0392 0.0303 0.0349 0.0375 R-Precision Exact 0.2787 0.3236 0.1504 0.2875