Robust track results — Chinese Academy of Sciences (CAS-NLPR)

Summary Statistics Run ID NLPR04COMB Run Description: Automatic run, title+desc+narr Kendall τ of difficulty predictions: 0.002

Topic set Old 200 New 49 Hard 50 All 249 Total number retrieved 200000 49000 50000 249000 Total relevant 15350 2062 4416 17412 Total relevant retrieved 9365 1555 2136 10920 Mean average precision 0.2759 0.3084 0.1148 0.2823 % topics with no relevant in top 10 7.5 10.2 12.0 8.0 area under MAP(X) curve 0.0204 0.0319 0.0161 0.0207

Document Level Averages Precision Old New Hard All At 5 docs 0.5250 0.5673 0.3240 0.5333 At 10 docs 0.4585 0.4694 0.2780 0.4606 At 15 docs 0.4207 0.4163 0.2613 0.4198 At 20 docs 0.3842 0.3765 0.2390 0.3827 At 30 docs 0.3308 0.3347 0.2100 0.3316 At 100 docs 0.1966 0.1800 0.1482 0.1933 At 200 docs 0.1359 0.1169 0.1085 0.1322 At 500 docs 0.0781 0.0565 0.0672 0.0738 At 1000 docs 0.0468 0.0317 0.0427 0.0439 R-Precision Exact 0.3147 0.3412 0.1772 0.3199