Question Answering track results — University of Amsterdam, Informatics Institute

Run ID uams04tc2 Combined weighted score: 0.131

Factoid Counts # right 29 # wrong 168 # inexact 7 # unsupported 26 NIL precision 0 / 7 = 0.000 NIL recall 0 / 22 = 0.000

Factoids: Accuracy Scores Num Q Accuracy all 230 0.126 initial 62 0.177 non-initial 168 0.107 PERSON 96 0.135 ORG 84 0.095 THING 50 0.160

Lists: Average F Scores Num Q F all 55 0.087 PERSON 17 0.035 ORG 22 0.155 THING 16 0.050

Others: Average F(β = 3) Scores Num Q F all 64 0.184 PERSON 23 0.222 ORG 25 0.161 THING 16 0.166

Average of Per-series Combined Weighted Scores Num targets Score all 64 0.135 PERSON 23 0.154 ORG 25 0.118 THING 16 0.136