Question Answering track results — Saarland University

Run ID mk2004qar1 Combined weighted score: 0.232

Factoid Counts # right 79 # wrong 131 # inexact 10 # unsupported 10 NIL precision 11 / 62 = 0.177 NIL recall 11 / 22 = 0.500

Factoids: Accuracy Scores Num Q Accuracy all 230 0.343 initial 62 0.419 non-initial 168 0.315 PERSON 96 0.333 ORG 84 0.286 THING 50 0.460

Lists: Average F Scores Num Q F all 55 0.096 PERSON 17 0.066 ORG 22 0.131 THING 16 0.080

Others: Average F(β = 3) Scores Num Q F all 64 0.145 PERSON 23 0.138 ORG 25 0.149 THING 16 0.148

Average of Per-series Combined Weighted Scores Num targets Score all 64 0.247 PERSON 23 0.239 ORG 25 0.213 THING 16 0.311