Question Answering track results — Korea University

Run ID KUQA3 Combined weighted score: 0.195

Factoid Counts # right 43 # wrong 180 # inexact 6 # unsupported 1 NIL precision 1 / 24 = 0.042 NIL recall 1 / 22 = 0.045

Factoids: Accuracy Scores Num Q Accuracy all 230 0.187 initial 62 0.210 non-initial 168 0.179 PERSON 96 0.104 ORG 84 0.274 THING 50 0.200

Lists: Average F Scores Num Q F all 55 0.157 PERSON 17 0.068 ORG 22 0.198 THING 16 0.194

Others: Average F(β = 3) Scores Num Q F all 64 0.247 PERSON 23 0.292 ORG 25 0.267 THING 16 0.153

Average of Per-series Combined Weighted Scores Num targets Score all 64 0.199 PERSON 23 0.152 ORG 25 0.247 THING 16 0.193