Question Answering track results — IBM T.J. Watson Research Center (Prager)

Run ID IBM1 Combined weighted score: 0.278

Factoid Counts # right 72 # wrong 148 # inexact 6 # unsupported 4 NIL response never returned

Factoids: Accuracy Scores Num Q Accuracy all 230 0.313 initial 62 0.435 non-initial 168 0.268 PERSON 96 0.312 ORG 84 0.262 THING 50 0.400

Lists: Average F Scores Num Q F all 55 0.200 PERSON 17 0.261 ORG 22 0.224 THING 16 0.102

Others: Average F(β = 3) Scores Num Q F all 64 0.285 PERSON 23 0.278 ORG 25 0.284 THING 16 0.298

Average of Per-series Combined Weighted Scores Num targets Score all 64 0.289 PERSON 23 0.317 ORG 25 0.240 THING 16 0.326