Question Answering track results — University of Edinburgh and Sydney

Run ID Edin2004C Combined weighted score: 0.105

Factoid Counts # right 21 # wrong 194 # inexact 8 # unsupported 7 NIL precision 0 / 5 = 0.000 NIL recall 0 / 22 = 0.000

Factoids: Accuracy Scores Num Q Accuracy all 230 0.091 initial 62 0.161 non-initial 168 0.065 PERSON 96 0.073 ORG 84 0.083 THING 50 0.140

Lists: Average F Scores Num Q F all 55 0.043 PERSON 17 0.012 ORG 22 0.049 THING 16 0.068

Others: Average F(β = 3) Scores Num Q F all 64 0.194 PERSON 23 0.193 ORG 25 0.142 THING 16 0.279

Average of Per-series Combined Weighted Scores Num targets Score all 64 0.112 PERSON 23 0.101 ORG 25 0.091 THING 16 0.161