Genomics track, annhi task results — University of Iowa

Precision Recall F-score Normalized Utility Tag Run Type Run Median Run Median Run Median Run Median iowarun1 automatic 0.3371 0.4174 0.5434 0.6000 0.4161 0.3584 0.4900 0.5365 iowarun2 automatic 0.3812 0.4174 0.4505 0.6000 0.4130 0.3584 0.4139 0.5365 iowarun3 automatic 0.3207 0.4174 0.6000 0.6000 0.4180 0.3584 0.5365 0.5365 iowarun4 automatic 0.1692 0.4174 0.1333 0.6000 0.1492 0.3584 0.1006 0.5365