Genomics track, annhi task results — UC Berkeley SIMS

Precision Recall F-score Normalized Utility Tag Run Type Run Median Run Median Run Median Run Median BIOTEXT21 automatic 0.2658 0.4174 0.8141 0.6000 0.4008 0.3584 0.7017 0.5365 BIOTEXT22 automatic 0.2708 0.4174 0.7960 0.6000 0.4041 0.3584 0.6888 0.5365 BIOTEXT23 automatic 0.4437 0.4174 0.2626 0.6000 0.3299 0.3584 0.2462 0.5365 BIOTEXT24 automatic 0.4452 0.4174 0.2707 0.6000 0.3367 0.3584 0.2538 0.5365 BIOTEXT25 automatic 0.4181 0.4174 0.2525 0.6000 0.3149 0.3584 0.2349 0.5365