Genomics track, annhi task results — Rutgers University (Dayanik)

Precision Recall F-score Normalized Utility Tag Run Type Run Median Run Median Run Median Run Median dimacsAabsw1 automatic 0.5979 0.4174 0.2283 0.6000 0.3304 0.3584 0.2206 0.5365 dimacsAg3mh automatic 0.5344 0.4174 0.4545 0.6000 0.4913 0.3584 0.4347 0.5365 dimacsAl3w automatic 0.5015 0.4174 0.3273 0.6000 0.3961 0.3584 0.3110 0.5365 dimacsAp5w5 automatic 0.5424 0.4174 0.1939 0.6000 0.2857 0.3584 0.1858 0.5365 dimacsAw20w5 automatic 0.6014 0.4174 0.1677 0.6000 0.2622 0.3584 0.1621 0.5365