Genomics track, annhi task results — German University in Cairo

Precision Recall F-score Normalized Utility Tag Run Type Run Median Run Median Run Median Run Median GUCbase automatic 0.1881 0.4174 1.0000 0.6000 0.3167 0.3584 0.7842 0.5365 GUCir30 automatic 0.2212 0.4174 0.8404 0.6000 0.3502 0.3584 0.6924 0.5365 GUCir50 automatic 0.2303 0.4174 0.8081 0.6000 0.3584 0.3584 0.6730 0.5365 GUCsvm0 automatic 0.2372 0.4174 0.7414 0.6000 0.3595 0.3584 0.6222 0.5365 GUCsvm5 automatic 0.2052 0.4174 0.9354 0.6000 0.3366 0.3584 0.7542 0.5365