Web track, named/home page finding task results — Illinois Institute of Technology

Summary Statistics Run ID iit03su Run Description DOCSTRUCT, ANCHORTEXT, NOLINKSTRUCT Num topics 300 overall named home Mean reciprocal rank 0.636 0.572 0.699 Num found at rank 1 156 (52.0%) 65 (43.3%) 91 (60.7%) Num found in top 10 257 (85.7%) 125 (83.3%) 132 (88.0%) Num not found in top 100 24 (8.0%) 13 (8.7%) 11 (7.3%)