Web track, topic distillation task results — CSIRO

Summary Statistics Run ID csiro03td02 Run Description DOCSTRUCT, ANCHORTEXT, LINKSTRUCT Number of Topics 50 Total number of documents over all topics Retrieved: 48503 Relevant: 516 Rel-ret: 294

Recall Level Precision Averages Recall Precision 0.00 0.3578 0.10 0.2608 0.20 0.2289 0.30 0.1782 0.40 0.1343 0.50 0.1179 0.60 0.0779 0.70 0.0576 0.80 0.0487 0.90 0.0417 1.00 0.0391 Average precision over all relevant docs non-interpolated 0.1272

Document Level Averages Precision At 5 docs 0.1200 At 10 docs 0.1060 At 15 docs 0.0973 At 20 docs 0.0870 At 30 docs 0.0647 At 100 docs 0.0352 At 200 docs 0.0228 At 500 docs 0.0108 At 1000 docs 0.0059 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1162